(C)onvert
---------

 To convert ANSI and ASCII files to PASCAL, BASIC, and C you will need to
 use this command.

 You will be prompted for the type of conversion. Enter the type, then the
 name of the file you want to convert.

 CONVERT (B)asic ms(C) (P)ascal?



(D)irectory
-----------
 Display file directory of the current logged path.
 Wildcard characters "*" and "?" are allowed.

 To display all the files, enter "*.*" or simply press <return>.

 PATTERN MATCHING EXAMPLES:  "*.ANS" , "MYSCR??.BIN" , "MYSCR.*"

 Use the (P)ath command (^KP) for changing paths.
 Refer to your DOS manual for more information on wildcards.


con(F)igure
-----------

 To configure some of Screen Editor's features to your personal preference,
 you may use this command.

 You must set the keyboard and function keys to your liking outside of the
 configuration routine. Once you have done this you can select the save
 feature, and they will be saved as you have set them. Other settings may
 be changed from within the config routine.

 Once this is done, your settings will be loaded in each time SE is run.

(E)rase
-------
 Erase a file in the current logged path.
 Wildcards are NOT allowed!

 You will be asked to verify the file name you enter, and if the file
 exists in the current logged path, it will be DELETED.

 Use the same amount of caution with this command as you would with
 DOS's "DEL" or "ERASE" commands.



(L)oad
------
 Load a previously saved SCReen EDitor screen file.
 Wildcards are NOT allowed.

 The file extension determines the type of file and the Load method used.
 ANSI files must have the extension ".ANS", ASCII files must have ".ASC".
 BINARY files may use any extension. You may wish to use ".BIN".
 Files with an extension other than ".ANS" or ".ASC" will be assumed to be
 Binary files. Only Binary files saved using SCReen EDitor can be loaded.



(P)ath
------
Set or change the current logged Path name.

Use this command to change drives and/or sub-directories.
The new path name must be in the format : [d:][\]<dir>[\<dir>....]

EXAMPLES:  "C:\SE\MYSCREEN" , "B:\"

The current logged path will remain un-changed if you enter an
invalid path name or press the Esc key.


(R)ename
--------

 Rename a file in the current logged path.
 Wildcards are NOT allowed.

 You will be prompted to enter the OLD file name and then the NEW file name.
 At either of these prompts you can press Function key F1 to display the
 directory of the current logged path.




(S)ave
------
Save or compile the currently displayed screen to a file.

You can select (A)nsi, (B)asic, b(I)nary, (P)ascal, a(S)cii or (D)base

(SCReen EDitor ver 1.0 allows only BINARY screen saves.)
Screens compiled to PASCAL, BASIC or DBASE are NOT re-Loadable.
Be sure to save your screens using BINARY, ANSI or ASCII after creating or
modifying them.
(NOTE: ANSI and ASCII files are generally smaller than BINARY files.)


e(X)ecute
---------

 To run another program, such as the Turbo editor, basica, command.com, etc.

 You can use this command. Once finished you will be returned to Screen Ed.

 You must have at least 256k of free memory for this function to work.

 Any legal command you use from the dos prompt can be used.


